0 1 2 3 4 5 6 7

]^{-2})c

) [(GeV/

Tpdy d_Tpπ 2_{ev}N / ( N^2d

7-10

4-10

1-10 210 510 810 Comb. fit

)×^4 (10 +π )×^3 (10 +K )×^2 p (10 )× d (10 )× He (10 3

= 2.76 TeV NNs ALICE, Pb-Pb 0-20%,

0 1 2 3 4 5 6 7

Data / Fit

0.5 1 1.5 2

)c (GeV/ Tp 0 1 2 3 4 5 6 7

Data / Fit

0.5 1 1.5 2